{smcl}
{* 18sep2002}{...}
{.-}
help for {cmd: mifit warning *}{right:(SJ3-3: st0042)}
{.-}

{title:Warning message from mifit}

{p 8}Number of observations differs across datasets.


{title:Explanation}

{p 8 8}The number of observations is different across the multiple datasets.
The maximum and minimum number of observations are displayed at the top
of the Overall Estimates table.

{p 8} You can see results from each of the multiple datasets
by using the {cmd:indiv} option in {help mifit}.
