{smcl}
{* 18sep2002}{...}
{.-}
help for {cmd: mici warning **}{right:(SJ3-3: st0042)}
{.-}

{title:Warning message from executing mici}

{p 4 4 2}No variation between datasets.


{title:Explanation}

{p 4 4 2}
The estimates are the same across the multiple datasets; i.e., there was no
between-imputation variation. The common result has been displayed.
